Lucknow: Anti-demo vehicle in CM Yogi’s convoy meets with accident; 11 injured

Lucknow, Feb 24 (IANS) At least 11 persons, including five police personnel, were injured after an anti-demo vehicle moving ahead of the convoy of Uttar Pradesh Yogi Adityanath lost control and rammed into several other cars on Saturday.

It was learnt that the accident happened near the Mari Mati Mandir in Arjun Ganj when a dog suddenly appeared in front of the anti-demo vehicle.

The anti-demonstration vehicle generally runs ahead to shield the convoy from coming in contact with any demonstration on the road while the convoy is on the move.

Joint Commissioner of Police (Law & Order), Upendra Agrawal, said the incident took place at around 7.45 p.m.

“Five police personnel and six civilians have sustained injuries in the accident. They have been admitted to different hospitals,” he told the media.

Principal Secretary to CM Sanjay Prasad and DGP Prashant Kumar had rushed to the spot of the accident.

–IANS

vkt/pgh

Disclaimer

The opinions expressed within this article are the personal opinions of the author. They do not reflect the views of the website and this website does not assume any responsibility or liability for the same.

The post Lucknow: Anti-demo vehicle in CM Yogi’s convoy meets with accident; 11 injured appeared first on Fresh Headline.